From 4401dce2b5545ce8117818812d8e3c8919f5f7fd Mon Sep 17 00:00:00 2001
From: Owen Jacobson <owen@grimoire.ca>
Date: Thu, 10 Oct 2024 21:05:48 -0400
Subject: Remove redundancy in `hi-ui` directory name.

---
 hi-ui/src/lib/components/LogOut.svelte | 22 ----------------------
 1 file changed, 22 deletions(-)
 delete mode 100644 hi-ui/src/lib/components/LogOut.svelte

(limited to 'hi-ui/src/lib/components/LogOut.svelte')

diff --git a/hi-ui/src/lib/components/LogOut.svelte b/hi-ui/src/lib/components/LogOut.svelte
deleted file mode 100644
index 01bef1b..0000000
--- a/hi-ui/src/lib/components/LogOut.svelte
+++ /dev/null
@@ -1,22 +0,0 @@
-<script>
-    import { logOut} from '$lib/apiServer';
-    import { currentUser } from '$lib/store';
-
-    async function handleLogout(event) {
-        const response = await logOut();
-        if (200 <= response.status && response.status < 300) {
-            currentUser.update(() => null);
-        }
-    }
-</script>
-
-<form on:submit|preventDefault={handleLogout}>
-    @{$currentUser.username}
-    <button
-        class="border-slate-500 border-solid border-2 font-bold p-1 rounded"
-        type="submit"
-    >log out</button>
-</form>
-
-<style>
-</style>
-- 
cgit v1.2.3

