From efae871b1bdb1e01081a44218281950cf0177f3b Mon Sep 17 00:00:00 2001
From: Kit La Touche <kit@transneptune.net>
Date: Thu, 10 Oct 2024 13:21:53 -0400
Subject: Adjust app container height down a bit.

I would love to make the whole-thing container 100vh, and let the row of
the interface sort out its own height. I will, eventually, I guess.
---
 hi-ui/src/routes/(app)/+layout.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'hi-ui/src/routes/(app)/+layout.svelte')

diff --git a/hi-ui/src/routes/(app)/+layout.svelte b/hi-ui/src/routes/(app)/+layout.svelte
index 98d4acf..9875817 100644
--- a/hi-ui/src/routes/(app)/+layout.svelte
+++ b/hi-ui/src/routes/(app)/+layout.svelte
@@ -77,7 +77,7 @@
 
 <style>
     #interface {
-        height: 89vh;
+        height: 88vh;
         margin: 1rem;
         display: grid;
         grid-template-columns: 18rem auto;
-- 
cgit v1.2.3

